I have said we are supposed to be as democrats the...

I have said we are supposed to be as democrats the party of unity. We are supposed to be the party that builds consensus. We are supposed be the part that governs equally without malice towards anyone. We are supposed to be the ones that find the solutions.

The promise — the covenant Democrat leadership had with the American people has been broken. They have not been the party of unity, nor the party of consensus, nor the party that governs without malice, nor the ones that find solutions. They have been the party of a faction that ignores broad based solutions in favor of using strong arm tactics to force through a left wing approach to health care reform.

But instead of actually trying finding the solutions and writing a piece of legislation that will get you a 90 percent solution with 70 percent agreement among the American people. They are going to ram this bill down the throats of this country and it is going to rip this nation to pieces politically and it will be a generation for this nation to recover.

These are strong words from Congressman Massa, but, his words give us some evidence that elements of the Democrat party are pleading for ObamaCare to be shelved. One may be skeptical of his claims of innocence, yet still give credence to his strong claims of unethical behavior on the part of Dem Leadership. ObamaCare is taking on some water and the bill may yet stink because of the dangerous tactics Dems have used to railroad the bill through Congress against the will of the American people.